User's Manual
kmag
Screen magnifier
kmag Generic Options Generic Options

Description
kmag, also known as is a screen magnifier. You can use to magnify a part of the screen just as you would use a lens to magnify a newspaper fine-print or a photograph. This application is useful for a variety of people: from researchers to artists to web-designers to people with low vision.

See Also
More detailed user documentation is available from help:/kmag (either enter this into , or run khelpcenter help:/kmag).
There is also further information available at the accessibility project home page.

Authors
was written by Olaf Schmidt ojschmidt@kde.org and Sarang Lakare sarang@users.sf.net and Michael Forster forster@fmi.uni-passau.de