Installation

How to obtain KMouth

Requirements
In order to successfully use KMouth, you need a speech synthesizer (and of course 3.x). KMouth uses about 15 MB of memory to run (plus the amount of memory needed by your speech synthesizer), but this may vary depending on your platform and configuration.

Compilation and Installation